1.8 1.82 1.84 1.86 1.88 1.9 1.92 0 200 400 600 800 1000

1200

1400

1600

1800

2000

2200

DMass {DDecayMode==1}^{Entries 154356}_{Mean 1.861}

RMS 0.0342 Underflow 0 Overflow 0

DMass {DDecayMode==1}

1.8 1.82 1.84 1.86 1.88 1.9 1.92 0 2000

4000

6000

8000

10000

12000

14000

16000

18000

20000

DMass {DDecayMode==2}^{Entries 1633895}_{Mean 1.864}

RMS 0.03415 Underflow 0 Overflow 0

DMass {DDecayMode==2}

1.75 1.8 1.85 1.9 1.95 0 5000

10000

15000

20000

25000

30000

35000

DMass {DDecayMode==3}^{Entries 2475153}_{Mean 1.859}

RMS 0.05637 Underflow 0 Overflow 0

DMass {DDecayMode==3}

1.8 1.82 1.84 1.86 1.88 1.9 1.92 0

500

1000

1500

2000

2500

3000

DMass {DDecayMode==4}^{Entries 221227}_{Mean 1.863}

RMS 0.03421 Underflow 0 Overflow 0

DMass {DDecayMode==4}