0 0.5 1 1.5 2 2.5 3 3.5 4 4.5 5 0

100

200

300

400

500

600 310 × nDl^{TH1nDl_total}_{Entries 625209}

Mean 1.051 RMS 0.2328 Underflow 0 Overflow 15

nDl

0 0.5 1 1.5 2 2.5 3 3.5 4 4.5 5 0

20

40

60

80

100

120

310 × nDl TH1nDl_sig_{Entries 130177}

Mean 1.001 RMS 0.03828 Underflow 0 Overflow 0

nDl

0 0.5 1 1.5 2 2.5 3 3.5 4 4.5 5 0

100

200

300

400

500 310 × nDl TH1nDl_bkg_{Entries 504698}

Mean 1.044 RMS 0.2154 Underflow 0 Overflow 9

nDl