0 0.5 1 1.5 2 2.5 3 3.5 4 4.5 5 0 50 100 150 200 250 300 350 400 310 × nDl_total^{TH1nDl_total}_{Entries 419861}

Mean 1.042 RMS 0.2087 Underflow 0 Overflow 6

nDl_total

0 0.5 1 1.5 2 2.5 3 3.5 4 4.5 5 0

20

40

60

80

100

120 310 × nDl_sig^{TH1nDl_sig}_{Entries 122651}

Mean 1.001 RMS 0.03553 Underflow 0 Overflow 0

nDl_sig

0 0.5 1 1.5 2 2.5 3 3.5 4 4.5 5 0

50

100

150

200

250

300 310 × nDl_bkg^{TH1nDl_bkg}_{Entries 304244}

Mean 1.034 RMS 0.1884 Underflow 0 Overflow 3

nDl_bkg