0 0.5 1 1.5 2 2.5 3 3.5 4 4.5 5 0

100

200

300

400

500

310 × nDl_total^{TH1nDl_total}_{Entries 600849}

Mean 1.066 RMS 0.2656 Underflow 0 Overflow 27

nDl_total

0 0.5 1 1.5 2 2.5 3 3.5 4 4.5 5 0

20

40

60

80

100

120 310 × nDl_sig^{TH1nDl_sig}_{Entries 124276}

Mean 1.001 RMS 0.03728 Underflow 0 Overflow 0

nDl_sig

0 0.5 1 1.5 2 2.5 3 3.5 4 4.5 5 0 50 100 150 200 250 300 350 400 450 310 × nDl_bkg^{TH1nDl_bkg}_{Entries 489492}

Mean 1.054 RMS 0.2414 Underflow 0 Overflow 15

nDl_bkg