0 0.5 1 1.5 2 2.5 3 3.5 4 4.5 5 0 200 400 600 800 1000

1200

1400

1600

1800 310 × nDl_total^{TH1nDl_total}_{Entries 2925650}

Mean 1.531 RMS 0.8153 Underflow 0 Overflow 1.048e+05

nDl_total

0 0.5 1 1.5 2 2.5 3 3.5 4 4.5 5 0 20 40 60 80 100 120 140 160 310 × nDl_sig^{TH1nDl_sig}_{Entries 158814}

Mean 1.003 RMS 0.05087 Underflow 0 Overflow 0

nDl_sig

0 0.5 1 1.5 2 2.5 3 3.5 4 4.5 5 0 200 400 600 800 1000

1200

1400

1600

1800 310 × nDl_bkg^{TH1nDl_bkg}_{Entries 2842476}

Mean 1.526 RMS 0.8127 Underflow 0 Overflow 1.011e+05

nDl_bkg