0 0.5 1 1.5 2 2.5 3 3.5 4 4.5 5 0

100

200

300

400

500

600

700 310 × nDl_total^{TH1nDl_total}_{Entries 834074}

Mean 1.158 RMS 0.425 Underflow 0 Overflow 512

nDl_total

0 0.5 1 1.5 2 2.5 3 3.5 4 4.5 5 0

nDl_sig^{TH1nDl_sig}_{Entries 75494}

Mean 1.002 RMS 0.04363 Underflow 0 Overflow 0

nDl_sig

0 0.5 1 1.5 2 2.5 3 3.5 4 4.5 5 0

100

200

300

400

500

600

700 310 × nDl_bkg^{TH1nDl_bkg}_{Entries 772876}

Mean 1.152 RMS 0.4171 Underflow 0 Overflow 464

nDl_bkg