0 0.5 1 1.5 2 2.5 3 3.5 4 4.5 5 0

100

200

300

400

500

310 × nDl_total^{TH1nDl_total}_{Entries 624019}

Mean 1.132 RMS 0.3851 Underflow 0 Overflow 209

nDl_total

0 0.5 1 1.5 2 2.5 3 3.5 4 4.5 5 0

nDl_sig^{TH1nDl_sig}_{Entries 71547}

Mean 1.031 RMS 0.1793 Underflow 0 Overflow 0

nDl_sig

0 0.5 1 1.5 2 2.5 3 3.5 4 4.5 5 0

100

200

300

400

500 310 × nDl_bkg^{TH1nDl_bkg}_{Entries 562454}

Mean 1.125 RMS 0.3751 Underflow 0 Overflow 173

nDl_bkg