0 0.5 1 1.5 2 2.5 3 3.5 4 4.5 5 0 100 200 300 400 500 600 700 800 900 310 × nDl_total^{TH1nDl_total}_{Entries 1132271}

Mean 1.207 RMS 0.4905 Underflow 0 Overflow 1408

nDl_total

0 0.5 1 1.5 2 2.5 3 3.5 4 4.5 5 0

nDl_sig^{TH1nDl_sig}_{Entries 76303}

Mean 1.007 RMS 0.08697 Underflow 0 Overflow 0

nDl_sig

0 0.5 1 1.5 2 2.5 3 3.5 4 4.5 5 0 100 200 300 400 500 600 700 800 900 310 × nDl_bkg^{TH1nDl_bkg}_{Entries 1076352}

Mean 1.199 RMS 0.481 Underflow 0 Overflow 1281

nDl_bkg