sysHist6

Entries 378 Mean -0.2518 RMS 1.266 Underflow 0 Overflow 0 Integral 378

-10 -8 -6 -4 -2 0 2 4 6 8 10 0

20

40

60

80

100

120 f_+0 sysErr^{sysHist6}_{Entries 378} f_+0 sysErr