* (GeV) lp 1.5 2

Candidates/100MeV

0 10000

20000

30000

0 * (GeV) Dp 1 1.5 2

Candidates/100MeV

0

10000

20000

0 B-Dl Θ cos -2 -1 0 1

Candidates/1.0

0

50

100

×

Θ 0

×

* (GeV) lp 1.5 2

Candidates/100MeV

0

10000

20000

0 * (GeV) Dp 1 1.5 2

Candidates/100MeV

0

5000

10000

0 B-Dl Θ cos -2 -1 0 1

Candidates/1.0

0 20000

40000

60000

Θ 0